Scale Contig_8191:

American_alligatorTEs American_alligatorGenes

500 bases allMis2 50 100 150 200 250 300 350 400 450 500 550 600 650 700 750 800 850 900 950 Croc and Bird Hub

Saker_falcon

Anc06

Crocodile

Gharial

Lizard

Couldn’t open https://s3-us-west-2.amazonaws.com/croc-paper-hub/liftoverbed/Genes/allMis2/allMis2.bb KB398007

Anc06refChr6525

scaffold-19694 1bp 21bp

scaffold28084 3bp 2bp5bp5bp 1bp